Ekin [MeV] D/95MeVmb

1,500E+01 5,589E-01

2,500E+01 4,947E-01

3,500E+01 4,663E-01

4,500E+01 4,937E-01

5,500E+01 5,274E-01

6,500E+01 5,632E-01

7,500E+01 6,042E-01

8,500E+01 6,411E-01

9,500E+01 7,011E-01

1,050E+02 7,411E-01

1,150E+02 7,663E-01

1,250E+02 7,926E-01

1,350E+02 8,242E-01

1,450E+02 8,558E-01

1,550E+02 8,863E-01

1,650E+02 9,084E-01

1,750E+02 9,221E-01

1,850E+02 9,347E-01

1,950E+02 9,432E-01

2,050E+02 9,463E-01

2,150E+02 9,453E-01

2,250E+02 9,400E-01

2,350E+02 9,316E-01

2,450E+02 9,189E-01

2,550E+02 9,042E-01

2,650E+02 8,874E-01

2,750E+02 8,684E-01

2,850E+02 8,484E-01

2,950E+02 8,274E-01

3,050E+02 8,074E-01

3,150E+02 7,895E-01

3,250E+02 7,705E-01

3,350E+02 7,526E-01

3,450E+02 7,347E-01

3,550E+02 7,168E-01

3,650E+02 7,011E-01

3,750E+02 6,853E-01

3,850E+02 6,705E-01

3,950E+02 6,558E-01

4,050E+02 6,421E-01

4,150E+02 6,295E-01

4,250E+02 6,179E-01

4,350E+02 6,063E-01

4,450E+02 5,947E-01

4,550E+02 5,853E-01

pion induced displacement damage in silicon most reliable data (checked with exp. values around resonance at 200 MeV), listed for kinetic energies between 15 MeV and 9 GeV

M. Huhtinen and P.A. Aarnio, NIM A335 (1993) 580 and priv. comm.*)

*) tabulation see also: A. Ferrari (ATLAS TDR ’97), priv. comm. 1997

for actual use of this tabulation, please refer to:

A. Vasilescu and G. Lindstroem

Displacement damage in Silicon on-line compilation: http://sesam.desy.de/~gunnar/Si-dfuncs

4,650E+02 5,768E-01

4,750E+02 5,684E-01

4,850E+02 5,611E-01

4,950E+02 5,558E-01

5,050E+02 5,537E-01

5,150E+02 5,526E-01

5,250E+02 5,537E-01

5,350E+02 5,547E-01

5,450E+02 5,600E-01

5,550E+02 5,653E-01

5,650E+02 5,674E-01

5,750E+02 5,684E-01

5,850E+02 5,642E-01

5,950E+02 5,600E-01

6,050E+02 5,516E-01

6,150E+02 5,442E-01

6,250E+02 5,347E-01

6,350E+02 5,253E-01

6,450E+02 5,158E-01

6,550E+02 5,063E-01

6,650E+02 4,989E-01

6,750E+02 4,926E-01

6,850E+02 4,895E-01

6,950E+02 4,863E-01

7,050E+02 4,874E-01

7,150E+02 4,895E-01

7,250E+02 4,926E-01

7,350E+02 4,968E-01

7,450E+02 5,032E-01

7,550E+02 5,126E-01

7,650E+02 5,221E-01

7,750E+02 5,326E-01

7,850E+02 5,432E-01

7,950E+02 5,537E-01

8,050E+02 5,621E-01

8,150E+02 5,695E-01

8,250E+02 5,747E-01

8,350E+02 5,800E-01

8,450E+02 5,842E-01

8,550E+02 5,863E-01

8,650E+02 5,874E-01

8,750E+02 5,853E-01

8,850E+02 5,789E-01

8,950E+02 5,716E-01

9,050E+02 5,653E-01

9,150E+02 5,600E-01

9,250E+02 5,537E-01

9,350E+02 5,474E-01

9,450E+02 5,421E-01

9,550E+02 5,368E-01

9,650E+02 5,316E-01

9,750E+02 5,274E-01

9,850E+02 5,263E-01

9,950E+02 5,242E-01

1,005E+03 5,232E-01

1,015E+03 5,211E-01

1,025E+03 5,200E-01

1,035E+03 5,179E-01

1,045E+03 5,158E-01

1,055E+03 5,147E-01

1,065E+03 5,126E-01

1,075E+03 5,137E-01

1,085E+03 5,147E-01

1,095E+03 5,168E-01

1,105E+03 5,189E-01

1,115E+03 5,211E-01

1,125E+03 5,221E-01

1,135E+03 5,242E-01

1,145E+03 5,263E-01

1,155E+03 5,284E-01

1,165E+03 5,295E-01

1,175E+03 5,316E-01

1,185E+03 5,337E-01

1,195E+03 5,347E-01

1,205E+03 5,368E-01

1,215E+03 5,379E-01

1,225E+03 5,400E-01

1,235E+03 5,411E-01

1,245E+03 5,432E-01

1,255E+03 5,442E-01

1,265E+03 5,463E-01

1,275E+03 5,453E-01

1,285E+03 5,453E-01

1,295E+03 5,442E-01

1,305E+03 5,432E-01

1,315E+03 5,432E-01

1,325E+03 5,421E-01

1,335E+03 5,411E-01

1,345E+03 5,400E-01

1,355E+03 5,400E-01

1,365E+03 5,389E-01

1,375E+03 5,368E-01

1,385E+03 5,347E-01

1,395E+03 5,326E-01

1,405E+03 5,305E-01

1,415E+03 5,284E-01

1,425E+03 5,274E-01

1,435E+03 5,253E-01

1,445E+03 5,232E-01

1,455E+03 5,211E-01

1,465E+03 5,189E-01

1,475E+03 5,168E-01

1,485E+03 5,158E-01

1,495E+03 5,137E-01

1,505E+03 5,126E-01

1,515E+03 5,105E-01

1,525E+03 5,084E-01

1,535E+03 5,074E-01

1,545E+03 5,053E-01

1,555E+03 5,032E-01

1,565E+03 5,021E-01

1,575E+03 5,011E-01

1,585E+03 4,989E-01

1,595E+03 4,979E-01

1,605E+03 4,968E-01

1,615E+03 4,958E-01

1,625E+03 4,947E-01

1,635E+03 4,937E-01

1,645E+03 4,926E-01

1,655E+03 4,916E-01

1,665E+03 4,905E-01

1,675E+03 4,895E-01

1,685E+03 4,895E-01

1,695E+03 4,884E-01

1,705E+03 4,874E-01

1,715E+03 4,874E-01

1,725E+03 4,863E-01

1,735E+03 4,863E-01

1,745E+03 4,853E-01

1,755E+03 4,842E-01

1,765E+03 4,842E-01

1,775E+03 4,842E-01

1,785E+03 4,832E-01

1,795E+03 4,832E-01

1,805E+03 4,832E-01

1,815E+03 4,832E-01

1,825E+03 4,832E-01

1,835E+03 4,832E-01

1,845E+03 4,832E-01

1,855E+03 4,832E-01

1,865E+03 4,821E-01

1,875E+03 4,821E-01

1,885E+03 4,821E-01

1,895E+03 4,821E-01

1,905E+03 4,811E-01

1,915E+03 4,811E-01

1,925E+03 4,811E-01

1,935E+03 4,800E-01

1,945E+03 4,800E-01

1,955E+03 4,800E-01

1,965E+03 4,800E-01

1,975E+03 4,789E-01

1,985E+03 4,789E-01

1,995E+03 4,789E-01

2,005E+03 4,779E-01

2,015E+03 4,779E-01

2,025E+03 4,779E-01

2,035E+03 4,779E-01

2,045E+03 4,768E-01

2,055E+03 4,768E-01

2,065E+03 4,768E-01

2,075E+03 4,758E-01

2,085E+03 4,758E-01

2,095E+03 4,758E-01

2,105E+03 4,747E-01

2,115E+03 4,747E-01

2,125E+03 4,747E-01

2,135E+03 4,747E-01

2,145E+03 4,737E-01

2,155E+03 4,737E-01

2,165E+03 4,737E-01

2,175E+03 4,726E-01

2,185E+03 4,726E-01

2,195E+03 4,726E-01

2,205E+03 4,716E-01

2,215E+03 4,716E-01

2,225E+03 4,716E-01

2,235E+03 4,716E-01

2,245E+03 4,705E-01

2,255E+03 4,705E-01

2,265E+03 4,705E-01

2,275E+03 4,695E-01

2,285E+03 4,695E-01

2,295E+03 4,695E-01

2,305E+03 4,695E-01

2,315E+03 4,695E-01

2,325E+03 4,695E-01

2,335E+03 4,695E-01

2,345E+03 4,695E-01

2,355E+03 4,695E-01

2,365E+03 4,695E-01

2,375E+03 4,695E-01

2,385E+03 4,695E-01

2,395E+03 4,695E-01

2,405E+03 4,695E-01

2,415E+03 4,695E-01

2,425E+03 4,695E-01

2,435E+03 4,684E-01

2,445E+03 4,684E-01

2,455E+03 4,684E-01

2,465E+03 4,684E-01

2,475E+03 4,684E-01

2,485E+03 4,684E-01

2,495E+03 4,684E-01

2,505E+03 4,684E-01

2,515E+03 4,674E-01

2,525E+03 4,674E-01

2,535E+03 4,674E-01

2,545E+03 4,674E-01

2,555E+03 4,674E-01

2,565E+03 4,674E-01

2,575E+03 4,674E-01

2,585E+03 4,663E-01

2,595E+03 4,663E-01

2,605E+03 4,663E-01

2,615E+03 4,663E-01

2,625E+03 4,663E-01

2,635E+03 4,663E-01

2,645E+03 4,663E-01

2,655E+03 4,663E-01

2,665E+03 4,653E-01

2,675E+03 4,653E-01

2,685E+03 4,653E-01

2,695E+03 4,653E-01

2,705E+03 4,653E-01

2,715E+03 4,653E-01

2,725E+03 4,653E-01

2,735E+03 4,642E-01

2,745E+03 4,642E-01

2,755E+03 4,642E-01

2,765E+03 4,642E-01

2,775E+03 4,642E-01

2,785E+03 4,642E-01

2,795E+03 4,642E-01

2,805E+03 4,642E-01

2,815E+03 4,632E-01

2,825E+03 4,632E-01

2,835E+03 4,632E-01

2,845E+03 4,632E-01

2,855E+03 4,632E-01

2,865E+03 4,632E-01

2,875E+03 4,632E-01

2,885E+03 4,632E-01

2,895E+03 4,632E-01

2,905E+03 4,632E-01

2,915E+03 4,632E-01

2,925E+03 4,632E-01

2,935E+03 4,632E-01

2,945E+03 4,621E-01

2,955E+03 4,621E-01

2,965E+03 4,621E-01

2,975E+03 4,621E-01

2,985E+03 4,621E-01

2,995E+03 4,621E-01

3,005E+03 4,621E-01

3,015E+03 4,621E-01

3,025E+03 4,621E-01

3,035E+03 4,621E-01

3,045E+03 4,621E-01

3,055E+03 4,621E-01

3,065E+03 4,611E-01

3,075E+03 4,611E-01

3,085E+03 4,611E-01

3,095E+03 4,611E-01

3,105E+03 4,611E-01

3,115E+03 4,611E-01

3,125E+03 4,611E-01

3,135E+03 4,611E-01

3,145E+03 4,611E-01

3,155E+03 4,611E-01

3,165E+03 4,611E-01

3,175E+03 4,611E-01

3,185E+03 4,600E-01

3,195E+03 4,600E-01

3,205E+03 4,600E-01

3,215E+03 4,600E-01

3,225E+03 4,600E-01

3,235E+03 4,600E-01

3,245E+03 4,600E-01

3,255E+03 4,600E-01

3,265E+03 4,600E-01

3,275E+03 4,600E-01

3,285E+03 4,600E-01

3,295E+03 4,600E-01

3,305E+03 4,589E-01

3,315E+03 4,589E-01

3,325E+03 4,589E-01

3,335E+03 4,589E-01

3,345E+03 4,589E-01

3,355E+03 4,589E-01

3,365E+03 4,589E-01

3,375E+03 4,589E-01

3,385E+03 4,589E-01

3,395E+03 4,589E-01

3,405E+03 4,589E-01

3,415E+03 4,579E-01

3,425E+03 4,579E-01

3,435E+03 4,579E-01

3,445E+03 4,579E-01

3,455E+03 4,579E-01

3,465E+03 4,579E-01

3,475E+03 4,579E-01

3,485E+03 4,579E-01

3,495E+03 4,579E-01

3,505E+03 4,568E-01

3,515E+03 4,568E-01

3,525E+03 4,568E-01

3,535E+03 4,568E-01

3,545E+03 4,568E-01

3,555E+03 4,568E-01

3,565E+03 4,568E-01

3,575E+03 4,558E-01

3,585E+03 4,558E-01

3,595E+03 4,558E-01

3,605E+03 4,558E-01

3,615E+03 4,558E-01

3,625E+03 4,558E-01

3,635E+03 4,558E-01

3,645E+03 4,547E-01

3,655E+03 4,547E-01

3,665E+03 4,547E-01

3,675E+03 4,547E-01

3,685E+03 4,547E-01

3,695E+03 4,547E-01

3,705E+03 4,547E-01

3,715E+03 4,537E-01

3,725E+03 4,537E-01

3,735E+03 4,537E-01

3,745E+03 4,537E-01

3,755E+03 4,537E-01

3,765E+03 4,537E-01

3,775E+03 4,537E-01

3,785E+03 4,526E-01

3,795E+03 4,526E-01

3,805E+03 4,526E-01

3,815E+03 4,526E-01

3,825E+03 4,526E-01

3,835E+03 4,526E-01

3,845E+03 4,526E-01

3,855E+03 4,516E-01

3,865E+03 4,516E-01

3,875E+03 4,516E-01

3,885E+03 4,516E-01

3,895E+03 4,516E-01

3,905E+03 4,516E-01

3,915E+03 4,505E-01

3,925E+03 4,505E-01

3,935E+03 4,505E-01

3,945E+03 4,505E-01

3,955E+03 4,505E-01

3,965E+03 4,505E-01

3,975E+03 4,505E-01

3,985E+03 4,495E-01

3,995E+03 4,495E-01

4,005E+03 4,495E-01

4,015E+03 4,495E-01

4,025E+03 4,495E-01

4,035E+03 4,495E-01

4,045E+03 4,495E-01

4,055E+03 4,484E-01

4,065E+03 4,484E-01

4,075E+03 4,484E-01

4,085E+03 4,484E-01

4,095E+03 4,484E-01

4,105E+03 4,484E-01

4,115E+03 4,484E-01

4,125E+03 4,474E-01

4,135E+03 4,474E-01

4,145E+03 4,474E-01

4,155E+03 4,474E-01

4,165E+03 4,474E-01

4,175E+03 4,474E-01

4,185E+03 4,474E-01

4,195E+03 4,463E-01

4,205E+03 4,463E-01

4,215E+03 4,463E-01

4,225E+03 4,463E-01

4,235E+03 4,463E-01

4,245E+03 4,463E-01

4,255E+03 4,463E-01

4,265E+03 4,453E-01

4,275E+03 4,453E-01

4,285E+03 4,453E-01

4,295E+03 4,453E-01

4,305E+03 4,453E-01

4,315E+03 4,453E-01

4,325E+03 4,453E-01

4,335E+03 4,442E-01

4,345E+03 4,442E-01

4,355E+03 4,442E-01

4,365E+03 4,442E-01

4,375E+03 4,442E-01

4,385E+03 4,442E-01

4,395E+03 4,442E-01

4,405E+03 4,432E-01

4,415E+03 4,432E-01

4,425E+03 4,432E-01

4,435E+03 4,432E-01

4,445E+03 4,432E-01

4,455E+03 4,432E-01

4,465E+03 4,432E-01

4,475E+03 4,421E-01

4,485E+03 4,421E-01

4,495E+03 4,421E-01

4,505E+03 4,421E-01

4,515E+03 4,421E-01

4,525E+03 4,421E-01

4,535E+03 4,421E-01

4,545E+03 4,411E-01

4,555E+03 4,411E-01

4,565E+03 4,411E-01

4,575E+03 4,411E-01

4,585E+03 4,411E-01

4,595E+03 4,411E-01

4,605E+03 4,411E-01

4,615E+03 4,400E-01

4,625E+03 4,400E-01

4,635E+03 4,400E-01

4,645E+03 4,400E-01

4,655E+03 4,400E-01

4,665E+03 4,400E-01

4,675E+03 4,400E-01

4,685E+03 4,389E-01

4,695E+03 4,389E-01

4,705E+03 4,389E-01

4,715E+03 4,389E-01

4,725E+03 4,389E-01

4,735E+03 4,389E-01

4,745E+03 4,389E-01

4,755E+03 4,379E-01

4,765E+03 4,379E-01

4,775E+03 4,379E-01

4,785E+03 4,379E-01

4,795E+03 4,379E-01

4,805E+03 4,379E-01

4,815E+03 4,379E-01

4,825E+03 4,368E-01

4,835E+03 4,368E-01

4,845E+03 4,368E-01

4,855E+03 4,368E-01

4,865E+03 4,368E-01

4,875E+03 4,368E-01

4,885E+03 4,368E-01

4,895E+03 4,358E-01

4,905E+03 4,358E-01

4,915E+03 4,358E-01

4,925E+03 4,358E-01

4,935E+03 4,358E-01

4,945E+03 4,358E-01

4,955E+03 4,358E-01

4,965E+03 4,358E-01

4,975E+03 4,347E-01

4,985E+03 4,347E-01

4,995E+03 4,347E-01

5,005E+03 4,347E-01

5,015E+03 4,347E-01

5,025E+03 4,347E-01

5,035E+03 4,347E-01

5,045E+03 4,347E-01

5,055E+03 4,337E-01

5,065E+03 4,337E-01

5,075E+03 4,337E-01

5,085E+03 4,337E-01

5,095E+03 4,337E-01

5,105E+03 4,337E-01

5,115E+03 4,337E-01

5,125E+03 4,337E-01

5,135E+03 4,326E-01

5,145E+03 4,326E-01

5,155E+03 4,326E-01

5,165E+03 4,326E-01

5,175E+03 4,326E-01

5,185E+03 4,326E-01

5,195E+03 4,326E-01

5,205E+03 4,316E-01

5,215E+03 4,316E-01

5,225E+03 4,316E-01

5,235E+03 4,316E-01

5,245E+03 4,316E-01

5,255E+03 4,316E-01

5,265E+03 4,316E-01

5,275E+03 4,316E-01

5,285E+03 4,305E-01

5,295E+03 4,305E-01

5,305E+03 4,305E-01

5,315E+03 4,305E-01

5,325E+03 4,305E-01

5,335E+03 4,305E-01

5,345E+03 4,305E-01

5,355E+03 4,305E-01

5,365E+03 4,295E-01

5,375E+03 4,295E-01

5,385E+03 4,295E-01

5,395E+03 4,295E-01

5,405E+03 4,295E-01

5,415E+03 4,295E-01

5,425E+03 4,295E-01

5,435E+03 4,295E-01

5,445E+03 4,284E-01

5,455E+03 4,284E-01

5,465E+03 4,284E-01

5,475E+03 4,284E-01

5,485E+03 4,284E-01

5,495E+03 4,284E-01

5,505E+03 4,284E-01

5,515E+03 4,284E-01

5,525E+03 4,274E-01

5,535E+03 4,274E-01

5,545E+03 4,274E-01

5,555E+03 4,274E-01

5,565E+03 4,274E-01

5,575E+03 4,274E-01

5,585E+03 4,274E-01

5,595E+03 4,274E-01

5,605E+03 4,263E-01

5,615E+03 4,263E-01

5,625E+03 4,263E-01

5,635E+03 4,263E-01

5,645E+03 4,263E-01

5,655E+03 4,263E-01

5,665E+03 4,263E-01

5,675E+03 4,253E-01

5,685E+03 4,253E-01

5,695E+03 4,253E-01

5,705E+03 4,253E-01

5,715E+03 4,253E-01

5,725E+03 4,253E-01

5,735E+03 4,253E-01

5,745E+03 4,242E-01

5,755E+03 4,242E-01

5,765E+03 4,242E-01

5,775E+03 4,242E-01

5,785E+03 4,242E-01

5,795E+03 4,242E-01

5,805E+03 4,242E-01

5,815E+03 4,232E-01

5,825E+03 4,232E-01

5,835E+03 4,232E-01

5,845E+03 4,232E-01

5,855E+03 4,232E-01

5,865E+03 4,232E-01

5,875E+03 4,232E-01

5,885E+03 4,221E-01

5,895E+03 4,221E-01

5,905E+03 4,221E-01

5,915E+03 4,221E-01

5,925E+03 4,221E-01

5,935E+03 4,221E-01

5,945E+03 4,221E-01

5,955E+03 4,211E-01

5,965E+03 4,211E-01

5,975E+03 4,211E-01

5,985E+03 4,211E-01

5,995E+03 4,211E-01

6,005E+03 4,211E-01

6,015E+03 4,211E-01

6,025E+03 4,211E-01

6,035E+03 4,200E-01

6,045E+03 4,200E-01

6,055E+03 4,200E-01

6,065E+03 4,200E-01

6,075E+03 4,200E-01

6,085E+03 4,200E-01

6,095E+03 4,200E-01

6,105E+03 4,189E-01

6,115E+03 4,189E-01

6,125E+03 4,189E-01

6,135E+03 4,189E-01

6,145E+03 4,189E-01

6,155E+03 4,189E-01

6,165E+03 4,189E-01

6,175E+03 4,179E-01

6,185E+03 4,179E-01

6,195E+03 4,179E-01

6,205E+03 4,179E-01

6,215E+03 4,179E-01

6,225E+03 4,179E-01

6,235E+03 4,179E-01

6,245E+03 4,168E-01

6,255E+03 4,168E-01

6,265E+03 4,168E-01

6,275E+03 4,168E-01

6,285E+03 4,168E-01

6,295E+03 4,168E-01

6,305E+03 4,168E-01

6,315E+03 4,168E-01

6,325E+03 4,158E-01

6,335E+03 4,158E-01

6,345E+03 4,158E-01

6,355E+03 4,158E-01

6,365E+03 4,158E-01

6,375E+03 4,158E-01

6,385E+03 4,158E-01

6,395E+03 4,147E-01

6,405E+03 4,147E-01

6,415E+03 4,147E-01

6,425E+03 4,147E-01

6,435E+03 4,147E-01

6,445E+03 4,147E-01

6,455E+03 4,147E-01

6,465E+03 4,137E-01

6,475E+03 4,137E-01

6,485E+03 4,137E-01

6,495E+03 4,137E-01

6,505E+03 4,137E-01

6,515E+03 4,137E-01

6,525E+03 4,137E-01

6,535E+03 4,137E-01

6,545E+03 4,126E-01

6,555E+03 4,126E-01

6,565E+03 4,126E-01

6,575E+03 4,126E-01

6,585E+03 4,126E-01

6,595E+03 4,126E-01

6,605E+03 4,126E-01

6,615E+03 4,116E-01

6,625E+03 4,116E-01

6,635E+03 4,116E-01

6,645E+03 4,116E-01

6,655E+03 4,116E-01

6,665E+03 4,116E-01

6,675E+03 4,116E-01

6,685E+03 4,105E-01

6,695E+03 4,105E-01

6,705E+03 4,105E-01

6,715E+03 4,105E-01

6,725E+03 4,105E-01

6,735E+03 4,105E-01

6,745E+03 4,105E-01

6,755E+03 4,105E-01

6,765E+03 4,095E-01

6,775E+03 4,095E-01

6,785E+03 4,095E-01

6,795E+03 4,095E-01

6,805E+03 4,095E-01

6,815E+03 4,095E-01

6,825E+03 4,095E-01

6,835E+03 4,084E-01

6,845E+03 4,084E-01

6,855E+03 4,084E-01

6,865E+03 4,084E-01

6,875E+03 4,084E-01

6,885E+03 4,084E-01

6,895E+03 4,084E-01

6,905E+03 4,084E-01

6,915E+03 4,074E-01

6,925E+03 4,074E-01

6,935E+03 4,074E-01

6,945E+03 4,074E-01

6,955E+03 4,074E-01

6,965E+03 4,074E-01

6,975E+03 4,074E-01

6,985E+03 4,063E-01

6,995E+03 4,063E-01

7,005E+03 4,063E-01

7,015E+03 4,063E-01

7,025E+03 4,063E-01

7,035E+03 4,063E-01

7,045E+03 4,063E-01

7,055E+03 4,063E-01

7,065E+03 4,053E-01

7,075E+03 4,053E-01

7,085E+03 4,053E-01

7,095E+03 4,053E-01

7,105E+03 4,053E-01

7,115E+03 4,053E-01

7,125E+03 4,053E-01

7,135E+03 4,042E-01

7,145E+03 4,042E-01

7,155E+03 4,042E-01

7,165E+03 4,042E-01

7,175E+03 4,042E-01

7,185E+03 4,042E-01

7,195E+03 4,042E-01

7,205E+03 4,042E-01

7,215E+03 4,032E-01

7,225E+03 4,032E-01

7,235E+03 4,032E-01

7,245E+03 4,032E-01

7,255E+03 4,032E-01

7,265E+03 4,032E-01

7,275E+03 4,032E-01

7,285E+03 4,021E-01

7,295E+03 4,021E-01

7,305E+03 4,021E-01

7,315E+03 4,021E-01

7,325E+03 4,021E-01

7,335E+03 4,021E-01

7,345E+03 4,021E-01

7,355E+03 4,021E-01

7,365E+03 4,011E-01

7,375E+03 4,011E-01

7,385E+03 4,011E-01

7,395E+03 4,011E-01

7,405E+03 4,011E-01

7,415E+03 4,011E-01

7,425E+03 4,011E-01

7,435E+03 4,000E-01

7,445E+03 4,000E-01

7,455E+03 4,000E-01

7,465E+03 4,000E-01

7,475E+03 4,000E-01

7,485E+03 4,000E-01

7,495E+03 4,000E-01

7,505E+03 4,000E-01

7,515E+03 3,989E-01

7,525E+03 3,989E-01

7,535E+03 3,989E-01

7,545E+03 3,989E-01

7,555E+03 3,989E-01

7,565E+03 3,989E-01

7,575E+03 3,989E-01

7,585E+03 3,979E-01

7,595E+03 3,979E-01

7,605E+03 3,979E-01

7,615E+03 3,979E-01

7,625E+03 3,979E-01

7,635E+03 3,979E-01

7,645E+03 3,979E-01

7,655E+03 3,979E-01

7,665E+03 3,968E-01

7,675E+03 3,968E-01

7,685E+03 3,968E-01

7,695E+03 3,968E-01

7,705E+03 3,968E-01

7,715E+03 3,968E-01

7,725E+03 3,968E-01

7,735E+03 3,968E-01

7,745E+03 3,958E-01

7,755E+03 3,958E-01

7,765E+03 3,958E-01

7,775E+03 3,958E-01

7,785E+03 3,958E-01

7,795E+03 3,958E-01

7,805E+03 3,958E-01

7,815E+03 3,947E-01

7,825E+03 3,947E-01

7,835E+03 3,947E-01

7,845E+03 3,947E-01

7,855E+03 3,947E-01

7,865E+03 3,947E-01

7,875E+03 3,947E-01

7,885E+03 3,947E-01

7,895E+03 3,937E-01

7,905E+03 3,937E-01

7,915E+03 3,937E-01

7,925E+03 3,937E-01

7,935E+03 3,937E-01

7,945E+03 3,937E-01

7,955E+03 3,937E-01

7,965E+03 3,937E-01

7,975E+03 3,926E-01

7,985E+03 3,926E-01

7,995E+03 3,926E-01

8,005E+03 3,926E-01

8,015E+03 3,926E-01

8,025E+03 3,926E-01

8,035E+03 3,926E-01

8,045E+03 3,926E-01

8,055E+03 3,916E-01

8,065E+03 3,916E-01

8,075E+03 3,916E-01

8,085E+03 3,916E-01

8,095E+03 3,916E-01

8,105E+03 3,916E-01

8,115E+03 3,916E-01

8,125E+03 3,905E-01

8,135E+03 3,905E-01

8,145E+03 3,905E-01

8,155E+03 3,905E-01

8,165E+03 3,905E-01

8,175E+03 3,905E-01

8,185E+03 3,905E-01

8,195E+03 3,905E-01

8,205E+03 3,895E-01

8,215E+03 3,895E-01

8,225E+03 3,895E-01

8,235E+03 3,895E-01

8,245E+03 3,895E-01

8,255E+03 3,895E-01

8,265E+03 3,895E-01

8,275E+03 3,895E-01

8,285E+03 3,884E-01

8,295E+03 3,884E-01

8,305E+03 3,884E-01

8,315E+03 3,884E-01

8,325E+03 3,884E-01

8,335E+03 3,884E-01

8,345E+03 3,884E-01

8,355E+03 3,884E-01

8,365E+03 3,874E-01

8,375E+03 3,874E-01

8,385E+03 3,874E-01

8,395E+03 3,874E-01

8,405E+03 3,874E-01

8,415E+03 3,874E-01

8,425E+03 3,874E-01

8,435E+03 3,874E-01

8,445E+03 3,863E-01

8,455E+03 3,863E-01

8,465E+03 3,863E-01

8,475E+03 3,863E-01

8,485E+03 3,863E-01

8,495E+03 3,863E-01

8,505E+03 3,863E-01

8,515E+03 3,863E-01

8,525E+03 3,853E-01

8,535E+03 3,853E-01

8,545E+03 3,853E-01

8,555E+03 3,853E-01

8,565E+03 3,853E-01

8,575E+03 3,853E-01

8,585E+03 3,853E-01

8,595E+03 3,853E-01

8,605E+03 3,842E-01

8,615E+03 3,842E-01

8,625E+03 3,842E-01

8,635E+03 3,842E-01

8,645E+03 3,842E-01

8,655E+03 3,842E-01

8,665E+03 3,842E-01

8,675E+03 3,832E-01

8,685E+03 3,832E-01

8,695E+03 3,832E-01

8,705E+03 3,832E-01

8,715E+03 3,832E-01

8,725E+03 3,832E-01

8,735E+03 3,832E-01

8,745E+03 3,832E-01

8,755E+03 3,821E-01

8,765E+03 3,821E-01

8,775E+03 3,821E-01

8,785E+03 3,821E-01

8,795E+03 3,821E-01

8,805E+03 3,821E-01

8,815E+03 3,821E-01

8,825E+03 3,821E-01

8,835E+03 3,811E-01

8,845E+03 3,811E-01

8,855E+03 3,811E-01

8,865E+03 3,811E-01

8,875E+03 3,811E-01

8,885E+03 3,811E-01

8,895E+03 3,811E-01

8,905E+03 3,811E-01

8,915E+03 3,800E-01

8,925E+03 3,800E-01

8,935E+03 3,800E-01

8,945E+03 3,800E-01

8,955E+03 3,800E-01

8,965E+03 3,800E-01

8,975E+03 3,800E-01

8,985E+03 3,800E-01

8,995E+03 3,789E-01

9,005E+03 3,789E-01